SIMARI Workout Gloves Mens and Women Weight Lifting Gloves with Wrist Support for Gym Training, Full Palm Protection for Fitness, Weightlifting, Exercise, Hanging, Pull ups

microfiber
Imported
Breathable & Comfortable, with Strong Grip & Wrist Support Capability.
【Full Palm Protection & Thicken Palm Pads】 SIMARI Workout Gloves with high-density stereo sponge palm pads in line with ergonomic design can fill the gap between your hands and the fitness equipment. Protect your hands from tear, calluses, and blisters. Play the role of protection and buffer, easing hands strain with great hand coverage, almost all the damaging friction is mitigated.
【Wrist Support & Strong Grip】The palms of SIMARI weight lifting gloves have honeycomb anti-slip silica points, which can increase friction, enhance grip, and provide stability. The adjustable wristband can reduce the pressure on the wrist and prevent sprains. Long wristbands provide better support, while short wristbands are suitable for wearing sports watches. Every design is to enhance hand protection for excellent people who love fitness.
【Breathable & Durable】The back of the gym gloves designed with light and thin fabric can fit well with your hands, providing your hands to breathe freely and feel comfortable while doing intense training, rejecting sweat and smell. Made of durable microfibre, has high wearability. It’s an ideal choice for workout gifts.
【Humanized Design & Multi-application】The pull tab design on the finger can take off the gloves easily after exercise without turning the exercise gloves over. And highly absorbent terry cloth on thumbs can be used to wipe sweat. These training gloves are suitable for Weightlifting, Pull Up, Exercise, Fitness, Gym Training, and General Workouts.
【Customer First, Service First】You have no risk to have a try. After receiving our products or encountering any problems during use, you can feel free to contact us for hassle-free support. Your Satisfaction is Our Top Priority.